From e4300a3552b104f54ec781dd23cfcf96252ec5c1 Mon Sep 17 00:00:00 2001
From: Tom Lane <tgl@sss.pgh.pa.us>
Date: Mon, 18 Jun 2018 14:53:21 -0400
Subject: Avoid platform-dependent output from Data::Dumper.

Per buildfarm, the output from Data::Dumper for an IEEE infinity
is platform-dependent (e.g. "inf" vs "Inf").  Just skip that one
test case in the plperlu test; testing it on the plperl side is
coverage enough.  Fixes issue in commit 1731e3741.
---
 contrib/jsonb_plperl/sql/jsonb_plperlu.sql | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'contrib/jsonb_plperl/sql/jsonb_plperlu.sql')

diff --git a/contrib/jsonb_plperl/sql/jsonb_plperlu.sql b/contrib/jsonb_plperl/sql/jsonb_plperlu.sql
index 49c71fbc441..907dd4f73c8 100644
--- a/contrib/jsonb_plperl/sql/jsonb_plperlu.sql
+++ b/contrib/jsonb_plperl/sql/jsonb_plperlu.sql
@@ -61,7 +61,8 @@ $$;
 
 SELECT roundtrip('null') is null;
 SELECT roundtrip('1');
-SELECT roundtrip('1E+131071');
+-- skip because Data::Dumper produces a platform-dependent spelling of infinity
+-- SELECT roundtrip('1E+131071');
 SELECT roundtrip('-1');
 SELECT roundtrip('1.2');
 SELECT roundtrip('-1.2');
-- 
cgit v1.2.3

