--
-- FOREIGN KEY
--

-- MATCH FULL
--
-- First test, check and cascade
--
CREATE TABLE PKTABLE ( ptest1 int PRIMARY KEY, ptest2 text );
CREATE TABLE FKTABLE ( ftest1 int REFERENCES PKTABLE MATCH FULL ON DELETE CASCADE ON UPDATE CASCADE, ftest2 int );

-- Insert test data into PKTABLE
INSERT INTO PKTABLE VALUES (1, 'Test1');
INSERT INTO PKTABLE VALUES (2, 'Test2');
INSERT INTO PKTABLE VALUES (3, 'Test3');
INSERT INTO PKTABLE VALUES (4, 'Test4');
INSERT INTO PKTABLE VALUES (5, 'Test5');

-- Insert successful rows into FK TABLE
INSERT INTO FKTABLE VALUES (1, 2);
INSERT INTO FKTABLE VALUES (2, 3);
INSERT INTO FKTABLE VALUES (3, 4);
INSERT INTO FKTABLE VALUES (NULL, 1);

-- Insert a failed row into FK TABLE
INSERT INTO FKTABLE VALUES (100, 2);

-- Check FKTABLE
SELECT * FROM FKTABLE;

-- Delete a row from PK TABLE
DELETE FROM PKTABLE WHERE ptest1=1;

-- Check FKTABLE for removal of matched row
SELECT * FROM FKTABLE;

-- Update a row from PK TABLE
UPDATE PKTABLE SET ptest1=1 WHERE ptest1=2;

-- Check FKTABLE for update of matched row
SELECT * FROM FKTABLE;

DROP TABLE PKTABLE;
DROP TABLE FKTABLE;

--
-- check set NULL and table constraint on multiple columns
--
CREATE TABLE PKTABLE ( ptest1 int, ptest2 int, ptest3 text, PRIMARY KEY(ptest1, ptest2) );
CREATE TABLE FKTABLE ( ftest1 int, ftest2 int, ftest3 int, CONSTRAINT constrname FOREIGN KEY(ftest1, ftest2) 
                       REFERENCES PKTABLE MATCH FULL ON DELETE SET NULL ON UPDATE SET NULL);

-- Insert test data into PKTABLE
INSERT INTO PKTABLE VALUES (1, 2, 'Test1');
INSERT INTO PKTABLE VALUES (1, 3, 'Test1-2');
INSERT INTO PKTABLE VALUES (2, 4, 'Test2');
INSERT INTO PKTABLE VALUES (3, 6, 'Test3');
INSERT INTO PKTABLE VALUES (4, 8, 'Test4');
INSERT INTO PKTABLE VALUES (5, 10, 'Test5');

-- Insert successful rows into FK TABLE
INSERT INTO FKTABLE VALUES (1, 2, 4);
INSERT INTO FKTABLE VALUES (1, 3, 5);
INSERT INTO FKTABLE VALUES (2, 4, 8);
INSERT INTO FKTABLE VALUES (3, 6, 12);
INSERT INTO FKTABLE VALUES (NULL, NULL, 0);

-- Insert failed rows into FK TABLE
INSERT INTO FKTABLE VALUES (100, 2, 4);
INSERT INTO FKTABLE VALUES (2, 2, 4);
INSERT INTO FKTABLE VALUES (NULL, 2, 4);
INSERT INTO FKTABLE VALUES (1, NULL, 4);

-- Check FKTABLE
SELECT * FROM FKTABLE;

-- Delete a row from PK TABLE
DELETE FROM PKTABLE WHERE ptest1=1 and ptest2=2;

-- Check FKTABLE for removal of matched row
SELECT * FROM FKTABLE;

-- Delete another row from PK TABLE
DELETE FROM PKTABLE WHERE ptest1=5 and ptest2=10;

-- Check FKTABLE (should be no change)
SELECT * FROM FKTABLE;

-- Update a row from PK TABLE
UPDATE PKTABLE SET ptest1=1 WHERE ptest1=2;

-- Check FKTABLE for update of matched row
SELECT * FROM FKTABLE;

DROP TABLE PKTABLE;
DROP TABLE FKTABLE;

--
-- check set default and table constraint on multiple columns
--
CREATE TABLE PKTABLE ( ptest1 int, ptest2 int, ptest3 text, PRIMARY KEY(ptest1, ptest2) );
CREATE TABLE FKTABLE ( ftest1 int DEFAULT -1, ftest2 int DEFAULT -2, ftest3 int, CONSTRAINT constrname2 FOREIGN KEY(ftest1, ftest2) 
                       REFERENCES PKTABLE MATCH FULL ON DELETE SET DEFAULT ON UPDATE SET DEFAULT);

-- Insert a value in PKTABLE for default
INSERT INTO PKTABLE VALUES (-1, -2, 'The Default!');

-- Insert test data into PKTABLE
INSERT INTO PKTABLE VALUES (1, 2, 'Test1');
INSERT INTO PKTABLE VALUES (1, 3, 'Test1-2');
INSERT INTO PKTABLE VALUES (2, 4, 'Test2');
INSERT INTO PKTABLE VALUES (3, 6, 'Test3');
INSERT INTO PKTABLE VALUES (4, 8, 'Test4');
INSERT INTO PKTABLE VALUES (5, 10, 'Test5');

-- Insert successful rows into FK TABLE
INSERT INTO FKTABLE VALUES (1, 2, 4);
INSERT INTO FKTABLE VALUES (1, 3, 5);
INSERT INTO FKTABLE VALUES (2, 4, 8);
INSERT INTO FKTABLE VALUES (3, 6, 12);
INSERT INTO FKTABLE VALUES (NULL, NULL, 0);

-- Insert failed rows into FK TABLE
INSERT INTO FKTABLE VALUES (100, 2, 4);
INSERT INTO FKTABLE VALUES (2, 2, 4);
INSERT INTO FKTABLE VALUES (NULL, 2, 4);
INSERT INTO FKTABLE VALUES (1, NULL, 4);

-- Check FKTABLE
SELECT * FROM FKTABLE;

-- Delete a row from PK TABLE
DELETE FROM PKTABLE WHERE ptest1=1 and ptest2=2;

-- Check FKTABLE to check for removal
SELECT * FROM FKTABLE;

-- Delete another row from PK TABLE
DELETE FROM PKTABLE WHERE ptest1=5 and ptest2=10;

-- Check FKTABLE (should be no change)
SELECT * FROM FKTABLE;

-- Update a row from PK TABLE
UPDATE PKTABLE SET ptest1=1 WHERE ptest1=2;

-- Check FKTABLE for update of matched row
SELECT * FROM FKTABLE;

DROP TABLE PKTABLE;
DROP TABLE FKTABLE;


--
-- First test, check with no on delete or on update
--
CREATE TABLE PKTABLE ( ptest1 int PRIMARY KEY, ptest2 text );
CREATE TABLE FKTABLE ( ftest1 int REFERENCES PKTABLE MATCH FULL, ftest2 int );

-- Insert test data into PKTABLE
INSERT INTO PKTABLE VALUES (1, 'Test1');
INSERT INTO PKTABLE VALUES (2, 'Test2');
INSERT INTO PKTABLE VALUES (3, 'Test3');
INSERT INTO PKTABLE VALUES (4, 'Test4');
INSERT INTO PKTABLE VALUES (5, 'Test5');

-- Insert successful rows into FK TABLE
INSERT INTO FKTABLE VALUES (1, 2);
INSERT INTO FKTABLE VALUES (2, 3);
INSERT INTO FKTABLE VALUES (3, 4);
INSERT INTO FKTABLE VALUES (NULL, 1);

-- Insert a failed row into FK TABLE
INSERT INTO FKTABLE VALUES (100, 2);

-- Check FKTABLE
SELECT * FROM FKTABLE;

-- Check PKTABLE
SELECT * FROM PKTABLE;

-- Delete a row from PK TABLE (should fail)
DELETE FROM PKTABLE WHERE ptest1=1;

-- Delete a row from PK TABLE (should succeed)
DELETE FROM PKTABLE WHERE ptest1=5;

-- Check PKTABLE for deletes
SELECT * FROM PKTABLE;

-- Update a row from PK TABLE (should fail)
UPDATE PKTABLE SET ptest1=0 WHERE ptest1=2;

-- Update a row from PK TABLE (should succeed)
UPDATE PKTABLE SET ptest1=0 WHERE ptest1=4;

-- Check PKTABLE for updates
SELECT * FROM PKTABLE;

DROP TABLE PKTABLE;
DROP TABLE FKTABLE;


-- MATCH unspecified

-- Base test restricting update/delete
CREATE TABLE PKTABLE ( ptest1 int, ptest2 int, ptest3 int, ptest4 text, PRIMARY KEY(ptest1, ptest2, ptest3) );
CREATE TABLE FKTABLE ( ftest1 int, ftest2 int, ftest3 int, ftest4 int,  CONSTRAINT constrname3
			FOREIGN KEY(ftest1, ftest2, ftest3) REFERENCES PKTABLE);

-- Insert Primary Key values
INSERT INTO PKTABLE VALUES (1, 2, 3, 'test1');
INSERT INTO PKTABLE VALUES (1, 3, 3, 'test2');
INSERT INTO PKTABLE VALUES (2, 3, 4, 'test3');
INSERT INTO PKTABLE VALUES (2, 4, 5, 'test4');

-- Insert Foreign Key values
INSERT INTO FKTABLE VALUES (1, 2, 3, 1); 
INSERT INTO FKTABLE VALUES (NULL, 2, 3, 2);
INSERT INTO FKTABLE VALUES (2, NULL, 3, 3);
INSERT INTO FKTABLE VALUES (NULL, 2, 7, 4);
INSERT INTO FKTABLE VALUES (NULL, 3, 4, 5);

-- Insert a failed values
INSERT INTO FKTABLE VALUES (1, 2, 7, 6);

-- Show FKTABLE
SELECT * from FKTABLE;

-- Try to update something that should fail
UPDATE PKTABLE set ptest2=5 where ptest2=2;

-- Try to update something that should succeed
UPDATE PKTABLE set ptest1=1 WHERE ptest2=3;

-- Try to delete something that should fail
DELETE FROM PKTABLE where ptest1=1 and ptest2=2 and ptest3=3;

-- Try to delete something that should work
DELETE FROM PKTABLE where ptest1=2;

-- Show PKTABLE and FKTABLE
SELECT * from PKTABLE;

SELECT * from FKTABLE;

DROP TABLE FKTABLE;
DROP TABLE PKTABLE;

-- cascade update/delete
CREATE TABLE PKTABLE ( ptest1 int, ptest2 int, ptest3 int, ptest4 text, PRIMARY KEY(ptest1, ptest2, ptest3) );
CREATE TABLE FKTABLE ( ftest1 int, ftest2 int, ftest3 int, ftest4 int,  CONSTRAINT constrname3
			FOREIGN KEY(ftest1, ftest2, ftest3) REFERENCES PKTABLE
			ON DELETE CASCADE ON UPDATE CASCADE);

-- Insert Primary Key values
INSERT INTO PKTABLE VALUES (1, 2, 3, 'test1');
INSERT INTO PKTABLE VALUES (1, 3, 3, 'test2');
INSERT INTO PKTABLE VALUES (2, 3, 4, 'test3');
INSERT INTO PKTABLE VALUES (2, 4, 5, 'test4');

-- Insert Foreign Key values
INSERT INTO FKTABLE VALUES (1, 2, 3, 1); 
INSERT INTO FKTABLE VALUES (NULL, 2, 3, 2);
INSERT INTO FKTABLE VALUES (2, NULL, 3, 3);
INSERT INTO FKTABLE VALUES (NULL, 2, 7, 4);
INSERT INTO FKTABLE VALUES (NULL, 3, 4, 5);

-- Insert a failed values
INSERT INTO FKTABLE VALUES (1, 2, 7, 6);

-- Show FKTABLE
SELECT * from FKTABLE;

-- Try to update something that will cascade
UPDATE PKTABLE set ptest2=5 where ptest2=2;

-- Try to update something that should not cascade
UPDATE PKTABLE set ptest1=1 WHERE ptest2=3;

-- Show PKTABLE and FKTABLE
SELECT * from PKTABLE;
SELECT * from FKTABLE;

-- Try to delete something that should cascade
DELETE FROM PKTABLE where ptest1=1 and ptest2=5 and ptest3=3;

-- Show PKTABLE and FKTABLE
SELECT * from PKTABLE;
SELECT * from FKTABLE;

-- Try to delete something that should not have a cascade
DELETE FROM PKTABLE where ptest1=2;

-- Show PKTABLE and FKTABLE
SELECT * from PKTABLE;
SELECT * from FKTABLE;

DROP TABLE FKTABLE;
DROP TABLE PKTABLE;

-- set null update / set default delete
CREATE TABLE PKTABLE ( ptest1 int, ptest2 int, ptest3 int, ptest4 text, PRIMARY KEY(ptest1, ptest2, ptest3) );
CREATE TABLE FKTABLE ( ftest1 int DEFAULT 0, ftest2 int, ftest3 int, ftest4 int,  CONSTRAINT constrname3
			FOREIGN KEY(ftest1, ftest2, ftest3) REFERENCES PKTABLE
			ON DELETE SET DEFAULT ON UPDATE SET NULL);

-- Insert Primary Key values
INSERT INTO PKTABLE VALUES (1, 2, 3, 'test1');
INSERT INTO PKTABLE VALUES (1, 3, 3, 'test2');
INSERT INTO PKTABLE VALUES (2, 3, 4, 'test3');
INSERT INTO PKTABLE VALUES (2, 4, 5, 'test4');

-- Insert Foreign Key values
INSERT INTO FKTABLE VALUES (1, 2, 3, 1); 
INSERT INTO FKTABLE VALUES (2, 3, 4, 1); 
INSERT INTO FKTABLE VALUES (NULL, 2, 3, 2);
INSERT INTO FKTABLE VALUES (2, NULL, 3, 3);
INSERT INTO FKTABLE VALUES (NULL, 2, 7, 4);
INSERT INTO FKTABLE VALUES (NULL, 3, 4, 5);

-- Insert a failed values
INSERT INTO FKTABLE VALUES (1, 2, 7, 6);

-- Show FKTABLE
SELECT * from FKTABLE;

-- Try to update something that will set null
UPDATE PKTABLE set ptest2=5 where ptest2=2;

-- Try to update something that should not set null
UPDATE PKTABLE set ptest2=2 WHERE ptest2=3 and ptest1=1;

-- Show PKTABLE and FKTABLE
SELECT * from PKTABLE;
SELECT * from FKTABLE;

-- Try to delete something that should set default
DELETE FROM PKTABLE where ptest1=2 and ptest2=3 and ptest3=4;

-- Show PKTABLE and FKTABLE
SELECT * from PKTABLE;
SELECT * from FKTABLE;

-- Try to delete something that should not set default
DELETE FROM PKTABLE where ptest2=5;

-- Show PKTABLE and FKTABLE
SELECT * from PKTABLE;
SELECT * from FKTABLE;

DROP TABLE FKTABLE;
DROP TABLE PKTABLE;

-- set default update / set null delete
CREATE TABLE PKTABLE ( ptest1 int, ptest2 int, ptest3 int, ptest4 text, PRIMARY KEY(ptest1, ptest2, ptest3) );
CREATE TABLE FKTABLE ( ftest1 int DEFAULT 0, ftest2 int DEFAULT -1, ftest3 int, ftest4 int,  CONSTRAINT constrname3
			FOREIGN KEY(ftest1, ftest2, ftest3) REFERENCES PKTABLE
			ON DELETE SET NULL ON UPDATE SET DEFAULT);

-- Insert Primary Key values
INSERT INTO PKTABLE VALUES (1, 2, 3, 'test1');
INSERT INTO PKTABLE VALUES (1, 3, 3, 'test2');
INSERT INTO PKTABLE VALUES (2, 3, 4, 'test3');
INSERT INTO PKTABLE VALUES (2, 4, 5, 'test4');
INSERT INTO PKTABLE VALUES (2, -1, 5, 'test5');

-- Insert Foreign Key values
INSERT INTO FKTABLE VALUES (1, 2, 3, 1); 
INSERT INTO FKTABLE VALUES (2, 3, 4, 1); 
INSERT INTO FKTABLE VALUES (2, 4, 5, 1);
INSERT INTO FKTABLE VALUES (NULL, 2, 3, 2);
INSERT INTO FKTABLE VALUES (2, NULL, 3, 3);
INSERT INTO FKTABLE VALUES (NULL, 2, 7, 4);
INSERT INTO FKTABLE VALUES (NULL, 3, 4, 5);

-- Insert a failed values
INSERT INTO FKTABLE VALUES (1, 2, 7, 6);

-- Show FKTABLE
SELECT * from FKTABLE;

-- Try to update something that will fail
UPDATE PKTABLE set ptest2=5 where ptest2=2;

-- Try to update something that will set default
UPDATE PKTABLE set ptest1=0, ptest2=5, ptest3=10 where ptest2=2;
UPDATE PKTABLE set ptest2=10 where ptest2=4;

-- Try to update something that should not set default
UPDATE PKTABLE set ptest2=2 WHERE ptest2=3 and ptest1=1;

-- Show PKTABLE and FKTABLE
SELECT * from PKTABLE;
SELECT * from FKTABLE;

-- Try to delete something that should set null
DELETE FROM PKTABLE where ptest1=2 and ptest2=3 and ptest3=4;

-- Show PKTABLE and FKTABLE
SELECT * from PKTABLE;
SELECT * from FKTABLE;

-- Try to delete something that should not set null
DELETE FROM PKTABLE where ptest2=5;

-- Show PKTABLE and FKTABLE
SELECT * from PKTABLE;
SELECT * from FKTABLE;

DROP TABLE FKTABLE;
DROP TABLE PKTABLE;

CREATE TABLE PKTABLE (ptest1 int PRIMARY KEY);
CREATE TABLE FKTABLE_FAIL1 ( ftest1 int, CONSTRAINT fkfail1 FOREIGN KEY (ftest2) REFERENCES PKTABLE);
CREATE TABLE FKTABLE_FAIL2 ( ftest1 int, CONSTRAINT fkfail1 FOREIGN KEY (ftest1) REFERENCES PKTABLE(ptest2));

DROP TABLE FKTABLE_FAIL1;
DROP TABLE FKTABLE_FAIL2;
DROP TABLE PKTABLE;

-- Test for referencing column number smaller than referenced constraint
CREATE TABLE PKTABLE (ptest1 int, ptest2 int, UNIQUE(ptest1, ptest2));
CREATE TABLE FKTABLE_FAIL1 (ftest1 int REFERENCES pktable(ptest1));

DROP TABLE FKTABLE_FAIL1;
DROP TABLE PKTABLE;

--
-- Tests for mismatched types
--
-- Basic one column, two table setup 
CREATE TABLE PKTABLE (ptest1 int PRIMARY KEY);
-- This next should fail, because inet=int does not exist
CREATE TABLE FKTABLE (ftest1 inet REFERENCES pktable);
-- This should also fail for the same reason, but here we
-- give the column name
CREATE TABLE FKTABLE (ftest1 inet REFERENCES pktable(ptest1));
-- This should succeed, even though they are different types
-- because varchar=int does exist
CREATE TABLE FKTABLE (ftest1 varchar REFERENCES pktable);
DROP TABLE FKTABLE;
-- As should this
CREATE TABLE FKTABLE (ftest1 varchar REFERENCES pktable(ptest1));
DROP TABLE FKTABLE;
DROP TABLE PKTABLE;

-- Two columns, two tables
CREATE TABLE PKTABLE (ptest1 int, ptest2 inet, PRIMARY KEY(ptest1, ptest2));
-- This should fail, because we just chose really odd types
CREATE TABLE FKTABLE (ftest1 cidr, ftest2 datetime, FOREIGN KEY(ftest1, ftest2) REFERENCES pktable);
-- Again, so should this...
CREATE TABLE FKTABLE (ftest1 cidr, ftest2 datetime, FOREIGN KEY(ftest1, ftest2) REFERENCES pktable(ptest1, ptest2));
-- This fails because we mixed up the column ordering
CREATE TABLE FKTABLE (ftest1 int, ftest2 inet, FOREIGN KEY(ftest2, ftest1) REFERENCES pktable);
-- As does this...
CREATE TABLE FKTABLE (ftest1 int, ftest2 inet, FOREIGN KEY(ftest2, ftest1) REFERENCES pktable(ptest1, ptest2));
-- And again..
CREATE TABLE FKTABLE (ftest1 int, ftest2 inet, FOREIGN KEY(ftest1, ftest2) REFERENCES pktable(ptest2, ptest1));
-- This works...
CREATE TABLE FKTABLE (ftest1 int, ftest2 inet, FOREIGN KEY(ftest2, ftest1) REFERENCES pktable(ptest2, ptest1));
DROP TABLE FKTABLE;
-- As does this
CREATE TABLE FKTABLE (ftest1 int, ftest2 inet, FOREIGN KEY(ftest1, ftest2) REFERENCES pktable(ptest1, ptest2));
DROP TABLE FKTABLE;
DROP TABLE PKTABLE;

-- Two columns, same table
-- Make sure this still works...
CREATE TABLE PKTABLE (ptest1 int, ptest2 inet, ptest3 int, ptest4 inet, PRIMARY KEY(ptest1, ptest2), FOREIGN KEY(ptest3,
ptest4) REFERENCES pktable(ptest1, ptest2));
DROP TABLE PKTABLE;
-- And this, 
CREATE TABLE PKTABLE (ptest1 int, ptest2 inet, ptest3 int, ptest4 inet, PRIMARY KEY(ptest1, ptest2), FOREIGN KEY(ptest3,
ptest4) REFERENCES pktable);
DROP TABLE PKTABLE;
-- This shouldn't (mixed up columns)
CREATE TABLE PKTABLE (ptest1 int, ptest2 inet, ptest3 int, ptest4 inet, PRIMARY KEY(ptest1, ptest2), FOREIGN KEY(ptest3,
ptest4) REFERENCES pktable(ptest2, ptest1));
-- Nor should this... (same reason, we have 4,3 referencing 1,2 which mismatches types
CREATE TABLE PKTABLE (ptest1 int, ptest2 inet, ptest3 int, ptest4 inet, PRIMARY KEY(ptest1, ptest2), FOREIGN KEY(ptest4,
ptest3) REFERENCES pktable(ptest1, ptest2));
-- Not this one either... Same as the last one except we didn't defined the columns being referenced.
CREATE TABLE PKTABLE (ptest1 int, ptest2 inet, ptest3 int, ptest4 inet, PRIMARY KEY(ptest1, ptest2), FOREIGN KEY(ptest4,
ptest3) REFERENCES pktable);

--
-- Now some cases with inheritance
-- Basic 2 table case: 1 column of matching types.
create table pktable_base (base1 int not null);
create table pktable (ptest1 int, primary key(base1), unique(base1, ptest1)) inherits (pktable_base);
create table fktable (ftest1 int references pktable(base1));
-- now some ins, upd, del
insert into pktable(base1) values (1);
insert into pktable(base1) values (2);
--  let's insert a non-existant fktable value
insert into fktable(ftest1) values (3);
--  let's make a valid row for that
insert into pktable(base1) values (3);
insert into fktable(ftest1) values (3);
-- let's try removing a row that should fail from pktable
delete from pktable where base1>2;
-- okay, let's try updating all of the base1 values to *4
-- which should fail.
update pktable set base1=base1*4;
-- okay, let's try an update that should work.
update pktable set base1=base1*4 where base1<3;
-- and a delete that should work
delete from pktable where base1>3;
-- cleanup
drop table fktable;
delete from pktable;

-- Now 2 columns 2 tables, matching types
create table fktable (ftest1 int, ftest2 int, foreign key(ftest1, ftest2) references pktable(base1, ptest1));
-- now some ins, upd, del
insert into pktable(base1, ptest1) values (1, 1);
insert into pktable(base1, ptest1) values (2, 2);
--  let's insert a non-existant fktable value
insert into fktable(ftest1, ftest2) values (3, 1);
--  let's make a valid row for that
insert into pktable(base1,ptest1) values (3, 1);
insert into fktable(ftest1, ftest2) values (3, 1);
-- let's try removing a row that should fail from pktable
delete from pktable where base1>2;
-- okay, let's try updating all of the base1 values to *4
-- which should fail.
update pktable set base1=base1*4;
-- okay, let's try an update that should work.
update pktable set base1=base1*4 where base1<3;
-- and a delete that should work
delete from pktable where base1>3;
-- cleanup
drop table fktable;
drop table pktable;
drop table pktable_base;

-- Now we'll do one all in 1 table with 2 columns of matching types
create table pktable_base(base1 int not null, base2 int);
create table pktable(ptest1 int, ptest2 int, primary key(base1, ptest1), foreign key(base2, ptest2) references
                                             pktable(base1, ptest1)) inherits (pktable_base);
insert into pktable (base1, ptest1, base2, ptest2) values (1, 1, 1, 1);
insert into pktable (base1, ptest1, base2, ptest2) values (2, 1, 1, 1);
insert into pktable (base1, ptest1, base2, ptest2) values (2, 2, 2, 1);
insert into pktable (base1, ptest1, base2, ptest2) values (1, 3, 2, 2);
-- fails (3,2) isn't in base1, ptest1
insert into pktable (base1, ptest1, base2, ptest2) values (2, 3, 3, 2);
-- fails (2,2) is being referenced
delete from pktable where base1=2;
-- fails (1,1) is being referenced (twice)
update pktable set base1=3 where base1=1;
-- this sequence of two deletes will work, since after the first there will be no (2,*) references
delete from pktable where base2=2;
delete from pktable where base1=2;
drop table pktable;
drop table pktable_base;

-- 2 columns (2 tables), mismatched types
create table pktable_base(base1 int not null);
create table pktable(ptest1 inet, primary key(base1, ptest1)) inherits (pktable_base);
-- just generally bad types (with and without column references on the referenced table)
create table fktable(ftest1 cidr, ftest2 int[], foreign key (ftest1, ftest2) references pktable);
create table fktable(ftest1 cidr, ftest2 int[], foreign key (ftest1, ftest2) references pktable(base1, ptest1));
-- let's mix up which columns reference which
create table fktable(ftest1 int, ftest2 inet, foreign key(ftest2, ftest1) references pktable);
create table fktable(ftest1 int, ftest2 inet, foreign key(ftest2, ftest1) references pktable(base1, ptest1));
create table fktable(ftest1 int, ftest2 inet, foreign key(ftest1, ftest2) references pktable(ptest1, base1));
drop table pktable;
drop table pktable_base;

-- 2 columns (1 table), mismatched types
create table pktable_base(base1 int not null, base2 int);
create table pktable(ptest1 inet, ptest2 inet[], primary key(base1, ptest1), foreign key(base2, ptest2) references
                                             pktable(base1, ptest1)) inherits (pktable_base);
create table pktable(ptest1 inet, ptest2 inet, primary key(base1, ptest1), foreign key(base2, ptest2) references
                                             pktable(ptest1, base1)) inherits (pktable_base);
create table pktable(ptest1 inet, ptest2 inet, primary key(base1, ptest1), foreign key(ptest2, base2) references
                                             pktable(base1, ptest1)) inherits (pktable_base);
create table pktable(ptest1 inet, ptest2 inet, primary key(base1, ptest1), foreign key(ptest2, base2) references
                                             pktable(base1, ptest1)) inherits (pktable_base);
drop table pktable;
drop table pktable_base;

